PRINT Your Name:

Quiz – November 5, 2004

Does the series ∞∑ n=1 n n + 200 converge or diverge? Explain.

Answer: This series DIVERGES by the Individual Term Test for Divergence because the limit of the individual terms is lim_{n→∞}^n_{n+200} = 1 and 1 does not equal zero.