IsoValue -0.694723 -0.57837 -0.500802 -0.423233 -0.345665 -0.268096 -0.190528 -0.112959 -0.0353906 0.0421779 0.119746 0.197315 0.274883 0.352452 0.43002 0.507589 0.585158 0.662726 0.740295 0.934216